
    This mode will allow you to define a section of the image to$
chart. These options are:                                       $
								$
	 MOVE BOX - The entire box will follow the movement of  $
	 the mouse.                                             $
								$
	 MOVE TOP EDGE OF BOX                                   $
	 MOVE BOTTOM EDGE OF BOX                                $
	 MOVE LEFT EDGE OF BOX                                  $
	 MOVE RIGHT EDGE OF BOX - These options allow you to    $
	  move any 1 side  of the box.                          $
								$
	 CHART THIS SECTION - The area encompassed by the box   $
	 will be chart.  You will be given to option to chart to$
	 a GIF file or to the printer.  If you choose to create $
	 a GIF file of the chart, you will be presented a window$
	 showing the files in the current print directory.  You $
	 can change the directory, select a file, or enter a    $
	 name for a new file. The image will then be charted to $
	 the file.                                              $
								$
	 If you choose to print to the printer you will be      $
	 presented the following information:                   $
								$
	       Page Height (H):                                 $
	       Page Width (W):                                  $
	       Title etc (T):                                   $
								$
	 Changing the Page height and or width will change how  $
	 much of the chart can be printed in each page. Using the$
	 Title field, you can add up to 50 characters for a      $
	 title, copyright or  other information.  Select OK when $
	 the information is correct.                             $
								 $
	 In addition to any title, on the top of each page will  $
	  be a page number, for example page 1.1, page 1.2, page $
	  2.1 The first number is the "column" the second number $
	  is the row. This information is presented to help with $
	  multi-paged charts.                                    $
								 $
	 If the chart of the image plus the symbol table take up $
	 more than 1 page, the symbol table will be printed on a $
	 separate page. The symbols table will have only the     $
	 symbols that are  used in this section of the image.    $

	 ABOUT THIS SECTION.....  - This option will give you the$
	 stitch size of the current section.                     $
